UWIS, Physik III, Lösung Serie 1

Thomas Kuster 14. April 2005

1 Umrechnung

[nm]  [μm]  [Å]  [Hz]  [ cm^{−1}]  [eV]
[nm]  x  10^{−3}x  10x  10^{9} \frac{c}{x}  10^{7} \frac{1}{x}  10^{9} \frac{hc}{x}
HeNe  632.8  6.328 · 10^{−1} 6.328 · 10^{3} 4.74 · 10^{14} 1.58 · 10^{4} 3.14 · 10^{−19}
[μm]  10^{3}x  x  10^{4}x  10^{6} \frac{c}{x}  10^{4} \frac{1}{x}  10^{6} \frac{hc}{x}
[Å]  10^{−1}x  10^{−4}x  x  10^{10} \frac{c}{x}  10^{8} \frac{1}{x}  10^{10} \frac{hc}{x}
[Hz]  10^{9} \frac{c}{x}  10^{6} \frac{c}{x}  10^{10} \frac{c}{x}  x  10^{−2} \frac{1}{x}  hx
[cm^{−1}] 10^{−7} \frac{1}{x}  10^{−10} \frac{1}{x}  10^{−6} \frac{1}{x}  10^{2}cx  x  10^{2}hcx
CO_{2} 1.06 · 10^{−10} 1.06 · 10^{−13} 1.06 · 10^{−9} 2.83 · 10^{13} 944.2 1.87 · 10^{−20}
[eV]  10^{9} \frac{ch}{x}  10^{6} \frac{ch}{x}  10^{10} \frac{ch}{x}  \frac{x}{h}  \frac{x}{ch}10^{−2}  x